:testgroup:
== infix-containers

Verifies Infix Docker container support:

 - Basic web server container running in host network mode
 - Common setup with a docker0 bridge, automatic VETH pairs to container(s)
 - Connecting a container with a VETH pair to a standard Linux bridge
 - Assigning a physical Ethernet interface to a container
 - Upgrading a container with a volume, verifying volume data is intact
 - Basic firewall container running in host network mode and full privileges

<<<

include::container_basic/Readme.adoc[]

include::container_bridge/Readme.adoc[]

include::container_phys/Readme.adoc[]

include::container_veth/Readme.adoc[]

include::container_volume/Readme.adoc[]

include::container_firewall_basic/Readme.adoc[]
