ifdef::topdoc[:imagesdir: {topdoc}../../test/case/infix_containers/container_basic]

=== Container basic
==== Description
Verify that a simple web server container can be configured to run
with host networking, on port 80.  Operation is verified using a
simple GET request for index.html and checking for a key phrase.

The RPC actions: stop + start, and restart are also verified.

==== Topology
image::topology.svg[Container basic topology, align=center, scaledwidth=75%]

==== Sequence
. Set up topology and attach to target DUT
. Set hostname to 'container-host'
. Create container 'web' from bundled OCI image
. Verify container 'web' has started
. Verify container 'web' is reachable on http://container-host.local:91
. Stop container 'web'
. Verify container 'web' is stopped
. Restart container 'web'
. Verify container 'web' is reachable on http://container-host.local:91


