=== Verify that VETH Pairs Can Be Deleted

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/interfaces/veth_delete]

==== Description

```
     veth0b       veth0a        data1    data2
          `---------'
```

Each test step to create, add address, or delete an interace is distinct
from any other step.  This to trigger a new configuration "generation".

==== Topology

image::topology.svg[Verify that VETH Pairs Can Be Deleted topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUT
. Create VETH pair
. Verify interfaces 'veth0a' and 'veth0b' exist
. Set IP address on target:data1 (dummy op)
. Set IP address on target:data2 (dummy op)
. Delete VETH pair
. Verify VETH pair has been removed


