=== Interface Description (ifAlias)

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/interfaces/ifalias]

==== Description

Verify interface description (ifAlias) can be set on an interface and
then be read back from the operational datastore.

==== Topology

image::topology.svg[Interface Description (ifAlias) topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUT
. Set up interface target:data with description
. Verify description can be read back from operational


