=== Static routing

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/routing/static_routing]

==== Description

Verify that it is possible to add static routes, both IPv4 and IPv6, and
that data forwarding works as expected via an intermediate device.

==== Topology

image::topology.svg[Static routing topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUTs
. Configure targets
. Wait for routes
. Configure host addresses and routes
. Verify that R2 is reachable on 192.168.200.1 from PC:data
. Verify that R2 is reachable on 2001:db8:3c4d:200::1 from PC:data
. Remove all static routes from R1
. Verify R2 is no longer reachable on either IPv4 or IPv6 from PC:data


