=== Get operational

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/misc/operational_all]

==== Description

Basic test just to get operational from test-config without errors.

==== Topology

image::topology.svg[Get operational topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUT
. Copy test-config to running configuration
. Get all Operational data from 'target', verify there are no errors


