=== Container with VETH pair

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/containers/veth]

==== Description

Verify connectivity with a simple web server container from behind a
regular bridge, a VETH pair connects the container to the bridge.

....
  .-------------.         .---------------.     .--------.
  |      | mgmt |---------| mgmt |        |     |  web-  |
  | host | data |---------| data | target |     | server |
  '-------------'         '---------------'     '--------'
                             |                    /
                            br0                  /
                              `----- veth0 -----'
....

==== Topology

image::topology.svg[Container with VETH pair topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUT
. Create 'web-br0-veth' container from bundled OCI image
. Verify container 'web-br0-veth' has started
. Verify basic DUT connectivity, host:data can ping DUT 10.0.0.2
. Verify container 'web-br0-veth' is reachable on http://10.0.0.2:91


