=== Container with bridge network

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/containers/bridge]

==== Description

Verify connectivity with a simple web server container from behind a
docker0 bridge.  As an added twist, this test also verifies content
mounts, i.e., custom index.html from running-config.

This also verifies port forwarding from container internal port to a
port accessed from the host.

==== Topology

image::topology.svg[Container with bridge network topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUT
. Create httpd container from bundled OCI image
. Verify container has started
. Verify DUT connectivity, host can reach 10.0.0.2
. Verify container is reachable on http://10.0.0.2:8080


