:testgroup:
== NTP Server Tests

Tests for NTP server functionality across different operational modes:

 - Standalone mode: local reference clock only
 - Server mode: sync from upstream while serving clients
 - Peer mode: bidirectional synchronization between peers
 - Server and client interoperability
 - Client stratum selection between multiple servers

include::server_mode_standalone/Readme.adoc[]

<<<

include::server_mode_server/Readme.adoc[]

<<<

include::server_mode_peer/Readme.adoc[]

<<<

include::server_client/Readme.adoc[]

<<<

include::client_stratum_selection/Readme.adoc[]
