=== Container with physical interface

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/containers/phys]

==== Description

Verify connectivity with a simple web server container that's been
given a physical interface instead of an end of a VETH pair.

==== Topology

image::topology.svg[Container with physical interface topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUT
. Create httpd container from bundled OCI image
. Verify container has started
. Verify host:data can ping 10.0.0.2
. Verify container is reachable on http://10.0.0.2:91
. Add a content mount, overriding index.html
. Verify server is restarted and returns new content


