=== Container Basic

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/containers/basic]

==== Description

Verify that a simple web server container can be configured to run
with host networking, on port 80.  Operation is verified using a
simple GET request for index.html and checking for a key phrase.

The RPC actions: stop + start, and restart are also verified.

==== Topology

image::topology.svg[Container Basic topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUT
. Set hostname to 'container-host'
. Create container 'web' from bundled OCI image
. Verify container 'web' has started
. Verify container 'web' is reachable on http://container-host.local:91
. Verify resource constraints and usage are available
. Stop container 'web'
. Verify container 'web' is stopped
. Restart container 'web'
. Verify container 'web' is reachable on http://container-host.local:91


