:testgroup:
== System

Tests verifying system configuration and management:

 - System hostname configuration and persistence
 - User account creation, modification, and deletion
 - Administrative user privilege management
 - System timezone configuration and handling
 - UTC offset timezone configuration
 - System upgrade and firmware management
 - NTP client configuration and time synchronization

include::hostname/Readme.adoc[]

<<<

include::add_delete_user/Readme.adoc[]

<<<

include::user_admin/Readme.adoc[]

<<<

include::nacm-basic/Readme.adoc[]

<<<

include::timezone/Readme.adoc[]

<<<

include::timezone_utc_offset/Readme.adoc[]

<<<

include::upgrade/Readme.adoc[]

<<<

include::ntp_client/Readme.adoc[]
