=== Remote syslog

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/syslog/remote]

==== Description

Verify logging to remote, acting as a remote, and RFC5424 log format.

==== Topology

image::topology.svg[Remote syslog topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to client and server DUTs
. Configure client DUT as syslog client with server DUT as remote, and configure server DUT as syslog server
. Send security:notice log message from client and verify reception of client log message, incl. sorting to /log/security on server


