=== Container enabled/disabled

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/containers/enabled]

==== Description

Verify that a container can be enabled and disabled via configuration.
Tests the 'enabled' leaf functionality by:

1. Creating an enabled container and verifying it starts
2. Disabling the container and verifying it stops
3. Re-enabling the container and verifying it starts again

Uses operational datastore to verify container running status.

==== Topology

image::topology.svg[Container enabled/disabled topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUT
. Set hostname to 'container-host'
. Create enabled container from bundled OCI image
. Verify container has started
. Disable container
. Verify container has stopped
. Re-enable container
. Verify container has started again


