=== Interface Status

ifdef::topdoc[:imagesdir: {topdoc}../../test/case/interfaces/iface_enable_disable]

==== Description

Verify interface status properly propagate changes when an interface
is disabled and then re-enabled.

Both admin-status and oper-status are verified.

==== Topology

image::topology.svg[Interface Status topology, align=center, scaledwidth=75%]

==== Sequence

. Set up topology and attach to target DUTs
. Configure bridge and associated interfaces in target1
. Disable interface in target2
. Verify the interface is disabled
. Enable the interface and assign an IP address
. Verify the interface is enabled
. Verify it is possible to ping the interface


